\gdef\ccNewRefManualStyle{\ccTrue}  % undef this for old style manual

% Optionally, package authors and a package release can be shown
% right below the chapter title. Comment out the following lines
% to get back to the default behavior.
% -----------------------------------------------------------------
\def\ccTagChapterAuthor{\ccTrue}
\def\ccTagChapterRelease{\ccTrue}

% The colunm layout can be set for all reference pages. Since
% local changes are possible, it is a good idea to enforce the
% the global layout before each reference page. This way, local
% changes of the layout do not change pages in the remainder
% of the manual.
% ------------------------------------------------------------
\newcommand{\cgalColumnLayout}{% example setting of the CGAL manuals
    \ccSetThreeColumns{CGAL_Oriented_side}{}{\hspace*{8.5cm}}%
    \ccPropagateThreeToTwoColumns
}
\cgalColumnLayout

\def\ccRefPageBegin{\ccParDims\cgalColumnLayout}
\def\ccRefPageEnd{\ccParDims\cgalColumnLayout}

% We define the global scope here, for example, to be 'CGAL::'.
% -------------------------------------------------------------
\ccDefGlobalScope{CGAL::}

\input{main}

%% EOF %%
